Title: Final assessment
Course: Quality Assurance of Blended and Online Learning

An untimed, repeatable assessment containing 20 questions selected at random from the course question bank. The pass grade is 16 out of 20 (80%).

Login required: Moodle does not allow guest quiz attempts. This backup does not issue a certificate.